-- 会员表增加EMP_LV属性字段
ALTER TABLE `AR_USER` ADD COLUMN `LAST_EMP_LV` varchar(32) COLLATE utf8mb4_bin NOT NULL DEFAULT '' COMMENT '最新EMP级别';
ALTER TABLE `AR_USER` ADD COLUMN `LAST_EMP_LV_UPDATED_AT` int(11) NOT NULL DEFAULT 0 COMMENT '最新EMP级别更新时间';
ALTER TABLE `AR_USER` ADD COLUMN `LAST_EMP_LV_UPDATED_PERIOD` int(11) NOT NULL DEFAULT 0 COMMENT '最新EMP级别更新期数';

-- 团队奖增加最高级别
ALTER TABLE `AR_CALC_BONUS_QY` ADD COLUMN `CROWN_LV` varchar(32) NOT NULL DEFAULT '' COMMENT '最高EMP级别' AFTER `LAST_CROWN_LV`;